CHORUS COMPETITION SCHEDULE

Minneapolis, MN - Sat - May 3, 2003

Chorus Number

Warm-up Room A

Warm-up Room B

Warm-up Room C

Ready room On-Stage Compete MicTest 11:45 - 12:25 12:30 1 11:55 - 12:25 12:25 - 12:35 12:40 2 12:05 - 12:35 12:35 - 12:45 12:50 3 12:15 - 12:45 12:45 - 12:55 1:00 4 12:25 - 12:55 12:55 - 1:05 1:10 5 12:35 - 1:05 1:05 - 1:15 1:20 6 12:45 - 1:15 1:15 - 1:25 1:30 7 12:55 - 1:25 1:25 - 1:35 1:40

Chorus Evaluations will be conducted immediately after the Contest. Exact times for each Chorus will be announced by the Contest Administrator at the conclusion of the Contest.

(4/28/03)